; Step1LT.def : Declares the module parameters for the DLL.

LIBRARY      "Step1LT"
DESCRIPTION  'Step1 Windows Dynamic Link Library'

EXPORTS
 LIBRARYENTRY @1
 LIBRARYNAME  @2